From 4d90c1983907ff3ea8a5a8c4dca1dba57c5bf3f8 Mon Sep 17 00:00:00 2001
From: letouzey
Date: Mon, 28 Sep 2009 15:04:07 +0000
Subject: Fix the stdlib doc compilation + switch all .v file to utf8

 1) compilation of Library.tex was failing on a "Ext_" in Diaconescu.v
    In fact coqdoc was trying to recognize the end of a _emphasis_ and
    hence inserted a bogus }. For the moment I've enclosed the phrase
    with [  ], but this emphasis "feature" of coqdoc seems _really_
    easy to broke. Matthieu ?

 2) By the way, this Library document was made from latin1 and utf8
    source file, hence bogus characters. All .v containing special
    characters are converted to utf8, and their first line is now
    mentionning this. (+ killed some old french comments and some
    other avoidable special characters).

  PLEASE: let's stick to this convention and avoid latin1, at least
    in .v files.

git-svn-id: svn+ssh://scm.gforge.inria.fr/svn/coq/trunk@12363 85f007b7-540e-0410-9357-904b9bb8a0f7
---
 doc/stdlib/Library.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'doc/stdlib/Library.tex')

diff --git a/doc/stdlib/Library.tex b/doc/stdlib/Library.tex
index 8a5c7ab767..f5509c3a3c 100755
--- a/doc/stdlib/Library.tex
+++ b/doc/stdlib/Library.tex
@@ -1,6 +1,6 @@
 \documentclass[11pt]{report}
 
-\usepackage[latin1]{inputenc}
+\usepackage[utf8x]{inputenc}
 \usepackage[T1]{fontenc}
 \usepackage{fullpage}
 \usepackage[color]{../../coqdoc}
-- 
cgit v1.2.3

