From d1c4ea65c490b59d34a5464554237a270063cbc9 Mon Sep 17 00:00:00 2001
From: Hugo Herbelin
Date: Thu, 19 Nov 2015 22:32:54 +0100
Subject: Ensuring that documentation of mli code works in the presence of
 utf-8 characters.

---
 dev/ocamldoc/header.tex | 14 ++++++++++++++
 1 file changed, 14 insertions(+)
 create mode 100644 dev/ocamldoc/header.tex

(limited to 'dev/ocamldoc/header.tex')

diff --git a/dev/ocamldoc/header.tex b/dev/ocamldoc/header.tex
new file mode 100644
index 0000000000..4091f8144f
--- /dev/null
+++ b/dev/ocamldoc/header.tex
@@ -0,0 +1,14 @@
+\documentclass[11pt]{article} 
+\usepackage[utf8x]{inputenc} 
+\usepackage[T1]{fontenc} 
+\usepackage{textcomp}
+\usepackage{tipa}
+\usepackage{textgreek}
+\usepackage{fullpage} 
+\usepackage{url} 
+\usepackage{ocamldoc}
+\title{Coq mlis documentation}
+\begin{document}
+\maketitle
+\tableofcontents
+\vspace{0.2cm}
-- 
cgit v1.2.3

